Figure 2. Comparable situation in bent vortex model (left) and practical data (right): shown are cores indicated by eigenvector (a) and b parallel v (b) methods, and a set of streamlines around each core.

Figure 4. Streamlines (top) and core lines (bottom) in a turbine runner at part load.

Figure 3. Vortex cores and streamlines in a water turbine draft tube.

a

a b b